<template>
	<view style="margin: 25rpx 25rpx 75rpx 25rpx;">
		<view style = "text-align: center;font-size: 43rpx; margin-bottom:10rpx"><text>{{flowData.title}}</text></view>
		<view class="h-table" style="margin-bottom:20rpx">
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">承办部门</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.cbbm" auto-height/></view>
				<view class="h-td h-td-center left-width">编    号</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.bh" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">承 办 人</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.cbr" auto-height/></view>
				<view class="h-td h-td-center left-width">承办人电话</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.cbrDh" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">对方单位名称</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.dfdwmc" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">合同名称及编号</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.htmcjbh" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">合同标的</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.htbd" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">合同主要内容</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.htzynr" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">承办意见</view>
				<view class="h-td h-td-left h-td-colspan"><textarea v-model="flowData.cbyj" auto-height/></view>
			</view>
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">附    件</view>
				<view class="h-td h-td-left h-td-colspan">
					<view v-if="!!flowData.fj" style="color: #ff0f07;" @click="downLoadFile()">点击查看附件</view>
					<view v-else >无</view>
				</view>
			</view>
			
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">铝产品部承办人</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.审核客户资质是否合格; </view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbCbr1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(1)具有经年检的营业执照及其他权利能力证明文件，且真实有效。</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr2" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(2)经营范围能够充分满足合同的需要；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr3" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(3)登陆国家企业信用信息公示系统，确定其不存在行政处罚、经营异常和严重违法信息记录；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr4" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">2.审核货权转移时点是否明确，审核交货地点、交货方式及责任划分是否明确；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr5" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">3.审核合同量是否明确；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr6" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">4.审核定价期是否明确，审核定价方式是否明确，且明确开票方式；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr7" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">5.审核货物验收相关条款是否明确，磅差处理相关条款是否明确；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr8" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">6.审核货款结算条款是否符合公司相关规定，审核付款方式、付款时点是否明确；审核结算价格的组成是否明确；</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr9" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">7.审核长单业务是否经过相关会议审议通过。</view>
						<view class="h-td h-td-left"><textarea v-model = "flowData.lcpbCbr10" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbCbrDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbCbrSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbCbrSprq" auto-height/></view>
					</view>
				</view>
			</view>
			
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">铝产品部副主任</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.协助部门负责人复核承办人的所有合规要求；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbFuzhuren1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbFuzhurenDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbFuzhurenSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbFuzhurenSprq" auto-height/></view>
					</view>
				</view>
			</view>
			
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">铝产品部负责人</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.全面复核承办人的所有合规要求；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbFuzeren1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbFuzerenDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbFuzerenSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbFuzerenSprq" auto-height/></view>
					</view>
				</view>
			</view>
			
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">审计内控与法律部审核人</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.审核合同主体、合同内容合法合规：</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(1)系统外的合同对方是合格的签约主体，拥有相关资质；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr2" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(2)合同不属于合同法第五十二条规定五种无效合同的范围。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr3" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">2.确保合同条款公平、合同权益保障充分：</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr4" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(1)主要条款完备，权利义务关系设计合理，若合同由对方草拟，确认无不平等条款和加重我方责任的条款；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr5" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(2)合同生效、变更、违约、争议条款在合同中明确规定，能够充分保障公司合法权益，其中，合同争议解决方式明确，如仲裁或诉讼，原则上推荐诉讼解决，若采取仲裁方式，须约定仲裁机构；违约责任承担方式具体明确，且具有可操作性；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr6" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">3.需要出具其他履约担保函的，审核担保是否有法律依据，担保函是否明确责任，担保日期是否在合同签订日期之前，授权代表签订的，查看是否提供授权证明。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr7" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">4.对合同审批流程进行合规性审查。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbSjnkyflbshr8" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbSjnkyflbshrDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbSjnkyflbshrSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbSjnkyflbshrSprq" auto-height/></view>
					</view>
				</view>
			</view>
				
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">综合管理部审核人</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.审核合同会签范围是否适当；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">2.审核合同编号是否合规；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr2" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">3.审核承办人所递交合同及相关附件是否完整、准确；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr3" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">4.审核合同严密性、可行性，确定合同不存在前后矛盾的条款；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr4" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">5.审核合同事项是否经过相关决策会议审议通过；需要招标的，审核是否经过招标程序；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr5" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">6.审核交易价款的形成方式的合理性，审核交易价款是否合理；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr6" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">7.审核合同整体风险是否可控，相关风险转移条款是否明确、合理。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZhglbshr7" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbZhglbshrDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbZhglbshrSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbZhglbshrSprq" auto-height/></view>
					</view>
				</view>
			</view>
				
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">财务部审核人</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.审核合同价款、税率及税费、支付/结算方式是否符合国家法律法 规、集团和公司的制度要求：</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbCwbshr1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(1)明确交易总金额或交易数量及结算价格，税率与合同约定事项匹配；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbCwbshr2" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(2)结算周期、付款时间合理；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbCwbshr3" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">(3)发票取得周期是否明确、合理；</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbCwbshr4" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">2.评估合同变更或解除的经济性，审核若发生变更或解除事项时是否仍能保证公司的基本利益。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbCwbshr5" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbCwbshrDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbCwbshrSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbCwbshrSprq" auto-height/></view>
					</view>
				</view>
			</view>
			
			<radio-group @change="getBmshyj">	
				<view class="h-tr h-tr-3">
					<view class="h-td h-td-center left-width">部门审核意见处理结果</view>
					<view class="h-td h-td-colspan h-td-rowspan">
						<view class="h-tr h-tr-2">
							<view class="h-td h-td-left" style = "width: 70rpx;"><radio value="1" :checked="flowData.lcpbBmshyjcljg1 == 1" /></view>
							<view class="h-td h-td-left h-td-colspan">全部采纳</view>
						</view>
						<view class="h-tr h-tr-2">
							<view class="h-td h-td-left" style = "width: 70rpx;"><radio value="2" :checked="flowData.lcpbBmshyjcljg2 == 1" /></view>
							<view class="h-td h-td-colspan h-td-rowspan">
								<view class="h-tr h-tr-1">
									<view class="h-td h-td-left h-td-colspan">部分采纳，未采纳意见原因：</view>
								</view>
								<view class="h-tr h-tr-1">
									<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;">
										<textarea v-model="flowData.lcpbBmshyjcljgDesc2" auto-height/>
									</view>
								</view>
							</view>
						</view>
						<view class="h-tr h-tr-2">
							<view class="h-td h-td-left" style = "width: 70rpx;"><radio value="3" :checked="flowData.lcpbBmshyjcljg3 == 1" /></view>
							<view class="h-td h-td-colspan h-td-rowspan">
								<view class="h-tr h-tr-1">
									<view class="h-td h-td-left h-td-colspan">全部不采纳，未采纳原因：</view>
								</view>
								<view class="h-tr h-tr-1">
									<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;">
										<textarea v-model="flowData.lcpbBmshyjcljgDesc3" auto-height/>
									</view>
								</view>
							</view>
						</view>
						<view class="h-tr h-tr-3">
							<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbBmshyjcljgSpr" auto-height/></view>
							<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbBmshyjcljgSprq" auto-height/></view>
						</view>
					</view>
				</view>
			</radio-group>
			
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">分管领导</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.审核合同是否已经过了前置审查，且对部门审核意见处理结果无异议。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbFgld1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbFgldDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbFgldSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbFgldSprq" auto-height/></view>
					</view>
				</view>
			</view>
			
			<view class="h-tr h-tr-4">
				<view class="h-td h-td-center left-width">总经理</view>
				<view class="h-td h-td-colspan h-td-rowspan">
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan">1.对合同进行审批，且已经过了前置审查。</view>
						<view class="h-td h-td-left"><textarea v-model="flowData.lcpbZjl1" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 100rpx;"><textarea v-model = "flowData.lcpbZjlDesc" auto-height/></view>
					</view>
					<view class="h-tr h-tr-3">
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbZjlSpr" auto-height/></view>
						<view class="h-td h-td-left h-td-colspan" style = "height: 50rpx;"><textarea v-model = "flowData.lcpbZjlSprq" auto-height/></view>
					</view>
				</view>
			</view>
		</view>
	</view>
</template>

<script>
	export default {
		props:['businessKey'],
		data() {
			return {
				flowData : {}
			}
		},
		beforeMount() {
			let self = this;
			this.admRequest({
				action : 'FlowMessageAction/contractFlowInfo',
				data : {
					id : self.businessKey
				},
				success(res){
					self.flowData = JSON.parse(res.data.data.dataText);
					self.flowData.step = res.data.data.step;
					self.flowData.id = res.data.data.id;
					
					var date = new Date();
					if (self.flowData.step == "1") {
						self.flowData.lcpbCbrSpr = res.data.userName;
						self.flowData.lcpbCbrSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "2") {
						self.flowData.lcpbFuzhurenSpr = res.data.userName;
						self.flowData.lcpbFuzhurenSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "3") {
						self.flowData.lcpbFuzerenSpr = res.data.userName;
						self.flowData.lcpbFuzerenSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "4") {
						self.flowData.lcpbSjnkyflbshrSpr = res.data.userName;
						self.flowData.lcpbSjnkyflbshrSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "5") {
						self.flowData.lcpbZhglbshrSpr = res.data.userName;
						self.flowData.lcpbZhglbshrSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "6") {
						self.flowData.lcpbCwbshrSpr = res.data.userName;
						self.flowData.lcpbCwbshrSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "7") {
						self.flowData.lcpbBmshyjcljgSpr = res.data.userName;
						self.flowData.lcpbBmshyjcljgSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "8") {
						self.flowData.lcpbFgldSpr = res.data.userName;
						self.flowData.lcpbFgldSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					} else if (self.flowData.step == "9") {
						self.flowData.lcpbZjlSpr = res.data.userName;
						self.flowData.lcpbZjlSprq = (date.getFullYear() + "-" + (date .getMonth() + 1) + "-" + date .getDate());
					}
				}
			})
		},
		methods:{
			downLoadFile(){
				let self = this;
				uni.showLoading({
					title:"加载中..."
				})
				uni.downloadFile({
					url : self.fileUrl,
					success: (res) => {
						let filePath = res.tempFilePath;
						if (res.statusCode === 200) {
							uni.openDocument({
								filePath: filePath,
								success: function (r) {
									console.log('打开文档成功');
								}
							});
						}
					},
					complete: (res)=> {
						uni.hideLoading();
					}
				})
			},
			getBmshyj(e){
				if (e.detail.value == '1') {
					this.flowData.lcpbBmshyjcljg1 = '1';
					this.flowData.lcpbBmshyjcljg2 = '0';
					this.flowData.lcpbBmshyjcljg3 = '0';
				} else if (e.detail.value == '2') {
					this.flowData.lcpbBmshyjcljg1 = '0';
					this.flowData.lcpbBmshyjcljg2 = '1';
					this.flowData.lcpbBmshyjcljg3 = '0';
				} else if (e.detail.value == '3') {
					this.flowData.lcpbBmshyjcljg1 = '0';
					this.flowData.lcpbBmshyjcljg2 = '0';
					this.flowData.lcpbBmshyjcljg3 = '1';
				}
			},
			getCallBackData(){
				var data = {};
				data.param = {callBackData : this.flowData};
				data.callBackUrl = "adm/FlowableApiAction/contractBackDeal";
				return data;
			}
		}
	}
</script>

<style lang="scss">
	/* 引入表格样式表 */
	@import "@/static/css/helang-table10.scss";
</style>
