CREATE TABLE im_newid_oldid_rel (
  NOR_OLDID 			varchar(50) 		NOT NULL 		COMMENT '旧数据主键ID',
  NOR_NEWID 			varchar(20) 		NOT NULL 		COMMENT '新数据主键ID',
  PRIMARY KEY (NOR_OLDID)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='数据迁移主键转换表 ';



