CREATE TABLE im_flow_log (
  FLL_ID     		 varchar(20) 	NOT NULL COMMENT '业务流水号',
  FLL_FLS_ID     	 varchar(20) 	NOT NULL COMMENT '流程业务编号im_flow_set.FLS_ID',  
  FLL_KEY	    	 varchar(100) 	NOT NULL COMMENT '业务KEY',
  FLL_NAME	    	 varchar(100) 	NOT NULL COMMENT '业务名称',
  FLL_ORDER_NUM    	 varchar(100) 	NOT NULL COMMENT '当前是第几步',
  FLL_STT    	 	 varchar(2) 	NOT NULL COMMENT '执行状态（00：通过，01：拒绝）',
  FLL_REMARK    	 varchar(100) 	NOT NULL COMMENT '备注',  
  FLL_FLOW_USER	 	 varchar(20) 	NOT NULL COMMENT '执行人',
  FLL_MODIFY_TIME	 varchar(14) 	NOT NULL COMMENT '最后修改时间',
  PRIMARY KEY (FLL_ID)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='流程执行记录表';
