CREATE TABLE `pub_OPEN_SYSTEM` (
  `POS_ID` varchar(32) 			NOT NULL COMMENT '编号',
  `POS_NAME` varchar(50) 		DEFAULT NULL COMMENT '名称',
  `POS_SYSTEMID` varchar(10) 	NOT NULL COMMENT '系统code',
  `POS_STATE` varchar(2) 		NOT NULL COMMENT '状态（0正常1停用）',
  `POS_CREATEUSER` varchar(15) 	DEFAULT NULL COMMENT '创建人',
  `POS_CREATETIME` varchar(15) 	DEFAULT NULL COMMENT '创建时间',
  PRIMARY KEY (`POS_ID`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8  COMMENT='对外系统配置表';
