#系统通用
insert into sequence (SEQ_NAME, CURRENT_VAL, INCREMENT_VAL, MIN_VAL, MAX_VAL,REMARKS) 
values('IM_LOG_NO','100000','1','100000','99999999','');
insert into sequence (SEQ_NAME, CURRENT_VAL, INCREMENT_VAL, MIN_VAL, MAX_VAL,REMARKS) 
values('IM_USER_NO','100000','1','100000','99999999','');
insert into sequence (SEQ_NAME, CURRENT_VAL, INCREMENT_VAL, MIN_VAL, MAX_VAL,REMARKS) 
values('IM_ROLE_NO','100000','1','100000','99999999','');
insert into sequence (SEQ_NAME, CURRENT_VAL, INCREMENT_VAL, MIN_VAL, MAX_VAL,REMARKS) 
values('IM_BRANCH_NO','100000','1','100000','99999999','');


